lwres_gai_strerror
lwres_gai_strerror
print suitable error string

#include <lwres/netdb.h>

char * gai_strerror int ecode

DESCRIPTION
lwres_gai_strerror() returns an error message corresponding to an error code returned by getaddrinfo(). The following error codes and their meaning are defined in include/lwres/netdb.h.
EAI_ADDRFAMILY 	 address family for hostname not supported
EAI_AGAIN 	 temporary failure in name resolution
EAI_BADFLAGS 	 invalid value for ai_flags
EAI_FAIL 	 non-recoverable failure in name resolution
EAI_FAMILY 	 ai_family not supported
EAI_MEMORY 	 memory allocation failure
EAI_NODATA 	 no address associated with hostname
EAI_NONAME 	 hostname or servname not provided, or not known
EAI_SERVICE 	 servname not supported for ai_socktype
EAI_SOCKTYPE 	 ai_socktype not supported
EAI_SYSTEM 	 system error returned in errno
The message invalid error code is returned if ecode is out of range.
ai_flags, ai_family and ai_socktype are elements of the struct addrinfo used by lwres_getaddrinfo().

SEE ALSO
strerror 3 , lwres_getaddrinfo 3 , getaddrinfo 3 , RFC2133 .